-- MySQL测试数据插入脚本
-- 连接到MySQL数据库: aigc
-- 用户名: root, 密码: 177615

USE aigc;

-- 删除现有测试数据（如果存在）
DELETE FROM users WHERE username IN ('demo', 'admin', 'testuser', 'mingzi_FBx7foZYDS7inLQb', '15538239326');

-- 插入测试用户数据
INSERT INTO users (username, email, password_hash, role, points) VALUES 
('demo', 'demo@example.com', 'demo', 'ROLE_USER', 100),
('admin', 'admin@example.com', 'admin123', 'ROLE_ADMIN', 200),
('testuser', 'testuser@example.com', 'test123', 'ROLE_USER', 75),
('mingzi_FBx7foZYDS7inLQb', 'mingzi@example.com', '123456', 'ROLE_USER', 25),
('15538239326', '15538239326@example.com', '0627', 'ROLE_USER', 50);

-- 验证插入结果
SELECT username, email, role, points FROM users WHERE username IN ('demo', 'admin', 'testuser', 'mingzi_FBx7foZYDS7inLQb', '15538239326');
