-- 为 storyboard_video_tasks 表添加 duration 字段
-- 执行时间：2025-11-19

ALTER TABLE storyboard_video_tasks 
ADD COLUMN duration INT NOT NULL DEFAULT 10 COMMENT '视频时长（秒）' AFTER hd_mode;

-- 更新现有记录，设置默认值为10秒
UPDATE storyboard_video_tasks SET duration = 10 WHERE duration IS NULL OR duration = 0;
