-- ====================================================
-- 定时任务表
-- ====================================================
DROP TABLE IF EXISTS `tb_crontab_task`;
CREATE TABLE `tb_crontab_task` (
    `id` VARCHAR(64) NOT NULL COMMENT '主键ID',
    `task_id` VARCHAR(64) NOT NULL COMMENT '任务ID',
    `task_name` VARCHAR(100) NOT NULL COMMENT '任务名称',
    `task_group` VARCHAR(50) NOT NULL DEFAULT 'DEFAULT' COMMENT '任务分组',
    `meta_id` VARCHAR(64) NOT NULL COMMENT '任务元数据ID',
    `default_recipient` TINYINT(1) NOT NULL DEFAULT 0 COMMENT '是否使用默认接收人（0:否 1:是）',
    `bean_name` VARCHAR(100) NOT NULL COMMENT 'Bean名称',
    `method_name` VARCHAR(100) NOT NULL COMMENT '方法名称',
    `method_params` VARCHAR(500) DEFAULT NULL COMMENT '方法参数',
    `cron_expression` VARCHAR(100) NOT NULL COMMENT 'Cron表达式',
    `status` TINYINT(1) NOT NULL DEFAULT 0 COMMENT '任务状态（0:暂停 1:运行中）',
    `description` VARCHAR(500) DEFAULT NULL COMMENT '任务描述',
    `concurrent` TINYINT(1) NOT NULL DEFAULT 0 COMMENT '是否允许并发执行（0:否 1:是）',
    `misfire_policy` TINYINT(1) NOT NULL DEFAULT 1 COMMENT '错过执行策略（1:立即执行 2:执行一次 3:放弃执行）',
    `creator` VARCHAR(64) DEFAULT NULL COMMENT '创建者',
    `updater` VARCHAR(64) DEFAULT NULL COMMENT '更新者',
    `create_time` DATETIME NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `update_time` DATETIME DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
    `delete_time` DATETIME DEFAULT NULL COMMENT '删除时间',
    `deleted` TINYINT(1) NOT NULL DEFAULT 0 COMMENT '是否删除（0:否 1:是）',
    PRIMARY KEY (`id`),
    KEY `idx_task_name` (`task_name`),
    KEY `idx_bean_name` (`bean_name`),
    KEY `idx_status` (`status`),
    KEY `idx_deleted` (`deleted`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='定时任务配置表';

-- ====================================================
-- 定时任务执行日志表
-- ====================================================
DROP TABLE IF EXISTS `tb_crontab_log`;
CREATE TABLE `tb_crontab_log` (
    `id` VARCHAR(64) NOT NULL COMMENT '主键ID',
    `task_id` VARCHAR(64) NOT NULL COMMENT '任务ID',
    `task_name` VARCHAR(100) NOT NULL COMMENT '任务名称',
    `task_group` VARCHAR(50) NOT NULL DEFAULT 'DEFAULT' COMMENT '任务分组',
    `bean_name` VARCHAR(100) NOT NULL COMMENT 'Bean名称',
    `method_name` VARCHAR(100) NOT NULL COMMENT '方法名称',
    `method_params` VARCHAR(500) DEFAULT NULL COMMENT '方法参数',
    `execute_status` TINYINT(1) NOT NULL COMMENT '执行状态（0:失败 1:成功）',
    `execute_message` TEXT DEFAULT NULL COMMENT '执行结果信息',
    `exception_info` TEXT DEFAULT NULL COMMENT '异常信息',
    `start_time` DATETIME NOT NULL COMMENT '开始时间',
    `end_time` DATETIME DEFAULT NULL COMMENT '结束时间',
    `execute_duration` INT DEFAULT NULL COMMENT '执行时长（毫秒）',
    `create_time` DATETIME NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `update_time` DATETIME DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
    `delete_time` DATETIME DEFAULT NULL COMMENT '删除时间',
    `deleted` TINYINT(1) NOT NULL DEFAULT 0 COMMENT '是否删除（0:否 1:是）',
    PRIMARY KEY (`id`),
    KEY `idx_task_id` (`task_id`),
    KEY `idx_task_name` (`task_name`),
    KEY `idx_execute_status` (`execute_status`),
    KEY `idx_start_time` (`start_time`),
    KEY `idx_deleted` (`deleted`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='定时任务执行日志表';

-- ====================================================
-- 定时任务元数据表（存储爬虫任务的元数据配置）
-- ====================================================
DROP TABLE IF EXISTS `tb_crontab_task_meta`;
CREATE TABLE `tb_crontab_task_meta` (
    `id` VARCHAR(64) NOT NULL COMMENT '主键ID',
    `meta_id` VARCHAR(64) NOT NULL COMMENT '元数据ID',
    `name` VARCHAR(100) NOT NULL COMMENT '任务名称',
    `description` VARCHAR(500) DEFAULT NULL COMMENT '任务描述',
    `category` VARCHAR(50) NOT NULL COMMENT '任务分类（如：人民日报新闻爬取）',
    `bean_name` VARCHAR(100) NOT NULL COMMENT 'Bean名称（执行器类名）',
    `method_name` VARCHAR(100) NOT NULL COMMENT '执行方法名',
    `script_path` VARCHAR(255) DEFAULT NULL COMMENT 'Python脚本路径（相对于basePath）',
    `param_schema` TEXT DEFAULT NULL COMMENT '参数模板（JSON格式，定义参数名、类型、描述、默认值等）',
    `auto_publish` TINYINT(1) NOT NULL DEFAULT 0 COMMENT '是否自动发布',
    `sort_order` INT DEFAULT 0 COMMENT '排序号',
    `creator` VARCHAR(64) DEFAULT NULL COMMENT '创建者',
    `updater` VARCHAR(64) DEFAULT NULL COMMENT '更新者',
    `create_time` DATETIME NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    `update_time` DATETIME DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
    `delete_time` DATETIME DEFAULT NULL COMMENT '删除时间',
    `deleted` TINYINT(1) NOT NULL DEFAULT 0 COMMENT '是否删除（0:否 1:是）',
    PRIMARY KEY (`id`),
    UNIQUE KEY `uk_meta_id` (`meta_id`),
    KEY `idx_category` (`category`),
    KEY `idx_deleted` (`deleted`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci COMMENT='定时任务元数据表';